-- 创建cms_content_view表（用户查看记录）
CREATE TABLE `cms_content_view` (
  `view_id` bigint(20) NOT NULL AUTO_INCREMENT COMMENT '查看记录ID',
  `user_id` bigint(20) NOT NULL COMMENT '用户ID',
  `user_name` varchar(50) NOT NULL COMMENT '用户名',
  `content_id` bigint(20) NOT NULL COMMENT '内容ID',
  `content_title` varchar(200) NOT NULL COMMENT '内容标题',
  `view_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '查看时间',
  `delete_flag` tinyint(4) NOT NULL DEFAULT '0' COMMENT '删除标志：0未删除，1已删除',
  PRIMARY KEY (`view_id`),
  KEY `idx_user_id` (`user_id`),
  KEY `idx_content_id` (`content_id`),
  KEY `idx_view_time` (`view_time`)
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8mb4 COMMENT='CMS内容查看记录表';